%&LaTeX
\documentclass{article}

\usepackage[latin1]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{Campagnano_etal2005} Edoardo Campagnano, Ester Ciancamerla, Michele Minichino, and Enrico Tronci. "Automatic Analysis of a Safety Critical Tele Control System." In \textit{24th International Conference on: Computer Safety, Reliability, and Security (SAFECOMP)}, edited by R. Winther, B. A. Gran and G. Dahll, 94--107. Lecture Notes in Computer Science 3688. Fredrikstad, Norway: Springer, 2005. ISSN: 3-540-29200-4. DOI: 10.1007/11563228_8.

\end{thebibliography}

\end{document}

