%&LaTeX
\documentclass{article}

\usepackage[latin1]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{DellaPenna_etal2003} Giuseppe Della Penna, Benedetto Intrigila, Igor Melatti, Michele Minichino, Ester Ciancamerla, Andrea Parisse, Enrico Tronci, and Marisa Venturini Zilli. "Automatic Verification of a Turbogas Control System with the Mur$\varphi$ Verifier." In \textit{Hybrid Systems: Computation and Control, 6th International Workshop, HSCC 2003 Prague, Czech Republic, April 3-5, 2003, Proceedings}, edited by O. Maler and A. Pnueli, 141--155. Lecture Notes in Computer Science 2623. Springer, 2003. ISSN: 3-540-00913-2. DOI: 10.1007/3-540-36580-X.

\end{thebibliography}

\end{document}

