\begin{thebibliography}{1}

\providecommand{\natexlab}[1]{#1}
\providecommand{\url}[1]{\texttt{#1}}
\providecommand{\urlprefix}{URL }
\providecommand{\eprint}[2][]{\url{#2}}

\bibitem[{Tronci et~al.}(2014){Tronci, Mancini, Mari, Melatti, Jacobsen, Ebeid, Mikkelsen, Prodanovic, Gruber \& Hayes}]{Tronci_etal2014} E. Tronci, T. Mancini, F. Mari, I. Melatti, R. H. Jacobsen, E. Ebeid, S. A. Mikkelsen, M. Prodanovic, J. K. Gruber, and B. Hayes. "SmartHG: Energy Demand Aware Open Services for Smart Grid Intelligent Automation." In \textit{Proceedings of the Work in Progress Session of SEAA/DSD 2014}., 2014. ISBN: 978-3-902457-40-0.

\end{thebibliography}

