%&LaTeX
\documentclass{article}

\usepackage[latin1]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{Gribaudo_etal2002} Marco Gribaudo, Andras Horv{\~A}{\textexclamdown}th, Andrea Bobbio, Enrico Tronci, Ester Ciancamerla, and Michele Minichino. "Model-Checking Based on Fluid Petri Nets for the Temperature Control System of the ICARO Co-generative Plant." In \textit{21st International Conference on Computer Safety, Reliability and Security (SAFECOMP)}, edited by S. Anderson, S. Bologna and M. Felici, 273--283. Lecture Notes in Computer Science 2434. Catania, Italy: Springer, 2002. ISSN: 3-540-44157-3. DOI: 10.1007/3-540-45732-1_27.

\end{thebibliography}

\end{document}

